289˚

289˚

290˚

290˚

291˚

291˚

292˚

292˚

-24˚ 30' -24˚ 30'

-24˚ 00' -24˚ 00'

-23˚ 30' -23˚ 30'

-23˚ 00' -23˚ 00'

-22˚ 30' -22˚ 30'

-22˚ 00' -22˚ 00'

-21˚ 30' -21˚ 30'

-21˚ 00' -21˚ 00'

-20˚ 30' -20˚ 30'

-20˚ 00' -20˚ 00'

-19˚ 30' -19˚ 30'

-19˚ 00' -19˚ 00'

-18˚ 30' -18˚ 30'

-18˚ 00' -18˚ 00'

-17˚ 30' -17˚ 30'

IQA0

IQD0

IQH0

IQL0

IQP0

1cm 92-91 libre

reference IQP0

1cm 92-91 fixe